From f7f11acafe0a404fa218c13832e32fce574ae0f6 Mon Sep 17 00:00:00 2001
From: Paul Oliver <contact@pauloliver.dev>
Date: Fri, 2 Jan 2026 11:37:35 +0000
Subject: Adds battery monitoring to frontend

---
 hsm-web/Client/src/App.vue | 11 +++++++++++
 1 file changed, 11 insertions(+)

(limited to 'hsm-web/Client/src/App.vue')

diff --git a/hsm-web/Client/src/App.vue b/hsm-web/Client/src/App.vue
index 202e4d2..84fefcf 100644
--- a/hsm-web/Client/src/App.vue
+++ b/hsm-web/Client/src/App.vue
@@ -1,3 +1,14 @@
 <template>
   <h1>HsMouse</h1>
+  <INA226 />
 </template>
+
+<script>
+import INA226 from './INA226.vue'
+
+export default {
+  components: {
+    INA226
+  }
+}
+</script>
-- 
cgit v1.2.3-70-g09d2

