From 81c97deaf7bd984a704db28f0cd676530a7b443e Mon Sep 17 00:00:00 2001
From: Paul Oliver <contact@pauloliver.dev>
Date: Sat, 3 Jan 2026 12:03:30 +0000
Subject: Skins frontend

---
 hsm-web/Client/src/INA226.vue | 12 +++++++++++-
 1 file changed, 11 insertions(+), 1 deletion(-)

(limited to 'hsm-web/Client/src/INA226.vue')

diff --git a/hsm-web/Client/src/INA226.vue b/hsm-web/Client/src/INA226.vue
index 1487fa3..dec961b 100644
--- a/hsm-web/Client/src/INA226.vue
+++ b/hsm-web/Client/src/INA226.vue
@@ -1,6 +1,6 @@
 <template>
   <h2>Battery Status</h2>
-  <table>
+  <table id='tina226'>
     <tbody>
       <tr>
         <td>{{ fmt(reading.voltage, 'V') }}</td>
@@ -41,3 +41,13 @@ export default {
   }
 }
 </script>
+
+<style>
+#tina226 td {
+  border:      1.5px solid #2aa198;
+  color:       #2aa198;
+  font-family: monospace;
+  font-size:   14px;
+  padding:     5px;
+}
+</style>
-- 
cgit v1.2.3-70-g09d2

